﻿set xact_abort on
go

begin transaction
go

set ANSI_NULLS on
go

create VIEW V_CelleOverview
AS
SELECT        dbo.Celle.CodCS, dbo.Celle.IdxCella, dbo.Celle.CodCella, dbo.Celle.X, dbo.Celle.Y, dbo.Celle.Z, ISNULL(dbo.PosizioneUdcCorrente.UDC, '') AS UDC
FROM            dbo.Celle LEFT OUTER JOIN
                         dbo.PosizioneUdcCorrente ON dbo.Celle.IdxCella = dbo.PosizioneUdcCorrente.IdxCella
go

exec sp_addextendedproperty 'MS_DiagramPane1', '[0E232FF0-B466-11cf-A24F-00AA00A3EFFF, 1.00]
Begin DesignProperties = 
   Begin PaneConfigurations = 
      Begin PaneConfiguration = 0
         NumPanes = 4
         Configuration = "(H (1[40] 4[20] 2[20] 3) )"
      End
      Begin PaneConfiguration = 1
         NumPanes = 3
         Configuration = "(H (1 [50] 4 [25] 3))"
      End
      Begin PaneConfiguration = 2
         NumPanes = 3
         Configuration = "(H (1 [50] 2 [25] 3))"
      End
      Begin PaneConfiguration = 3
         NumPanes = 3
         Configuration = "(H (4 [30] 2 [40] 3))"
      End
      Begin PaneConfiguration = 4
         NumPanes = 2
         Configuration = "(H (1 [56] 3))"
      End
      Begin PaneConfiguration = 5
         NumPanes = 2
         Configuration = "(H (2 [66] 3))"
      End
      Begin PaneConfiguration = 6
         NumPanes = 2
         Configuration = "(H (4 [50] 3))"
      End
      Begin PaneConfiguration = 7
         NumPanes = 1
         Configuration = "(V (3))"
      End
      Begin PaneConfiguration = 8
         NumPanes = 3
         Configuration = "(H (1[56] 4[18] 2) )"
      End
      Begin PaneConfiguration = 9
         NumPanes = 2
         Configuration = "(H (1 [75] 4))"
      End
      Begin PaneConfiguration = 10
         NumPanes = 2
         Configuration = "(H (1[66] 2) )"
      End
      Begin PaneConfiguration = 11
         NumPanes = 2
         Configuration = "(H (4 [60] 2))"
      End
      Begin PaneConfiguration = 12
         NumPanes = 1
         Configuration = "(H (1) )"
      End
      Begin PaneConfiguration = 13
         NumPanes = 1
         Configuration = "(V (4))"
      End
      Begin PaneConfiguration = 14
         NumPanes = 1
         Configuration = "(V (2))"
      End
      ActivePaneConfig = 0
   End
   Begin DiagramPane = 
      Begin Origin = 
         Top = 0
         Left = 0
      End
      Begin Tables = 
         Begin Table = "Celle"
            Begin Extent = 
               Top = 35
               Left = 80
               Bottom = 285
               Right = 250
            End
            DisplayFlags = 280
            TopColumn = 0
         End
         Begin Table = "PosizioneUdcCorrente"
            Begin Extent = 
               Top = 42
               Left = 422
               Bottom = 171
               Right = 592
            End
            DisplayFlags = 280
            TopColumn = 0
         End
      End
   End
   Begin SQLPane = 
   End
   Begin DataPane = 
      Begin ParameterDefaults = ""
      End
      Begin ColumnWidths = 9
         Width = 284
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
      End
   End
   Begin CriteriaPane = 
      Begin ColumnWidths = 11
         Column = 1440
         Alias = 900
         Table = 1170
         Output = 720
         Append = 1400
         NewValue = 1170
         SortType = 1350
         SortOrder = 1410
         GroupBy = 1350
         Filter = 1350
         Or = 1350
         Or = 1350
         Or = 1350
      End
   End
End
', 'SCHEMA', 'dbo', 'VIEW', 'V_CelleOverview'
go

exec sp_addextendedproperty 'MS_DiagramPaneCount', 1, 'SCHEMA', 'dbo', 'VIEW', 'V_CelleOverview'
go

create VIEW V_DettMagPart
AS
SELECT        TOP (100) PERCENT dbo.AnagMag.CodCS, dbo.AnagMag.CodMag, dbo.AnagMag.DescMag, dbo.Blocchi.IdxBlocco, dbo.Blocchi.CodBlocco, 
                         dbo.ElencoCartellini.Particolare, dbo.ElencoCartellini.Esponente, COUNT(dbo.PosizioneUdcCorrente.UDC) AS NumUDC, 
                         ISNULL(MIN(dbo.PosizioneUdcCorrente.DataRif), GETDATE()) AS Oldest, ISNULL(MAX(dbo.PosizioneUdcCorrente.DataRif), GETDATE()) AS Newest, 
                         SUM(dbo.ElencoCartellini.Qta) AS QtaTotPz, dbo.AnagStatiProdotto.DescStato
FROM            dbo.AnagMag INNER JOIN
                         dbo.Blocchi ON dbo.AnagMag.CodMag = dbo.Blocchi.CodMag AND dbo.AnagMag.CodCS = dbo.Blocchi.CodCS INNER JOIN
                         dbo.Celle INNER JOIN
                         dbo.ElencoCartellini INNER JOIN
                         dbo.PosizioneUdcCorrente ON dbo.ElencoCartellini.UDC = dbo.PosizioneUdcCorrente.UDC ON dbo.Celle.IdxCella = dbo.PosizioneUdcCorrente.IdxCella ON 
                         dbo.Blocchi.IdxBlocco = dbo.Celle.IdxBlocco INNER JOIN
                         dbo.AnagStatiProdotto ON dbo.ElencoCartellini.CodStato = dbo.AnagStatiProdotto.CodStato
WHERE        (dbo.Celle.Attiva = 1)
GROUP BY dbo.AnagMag.CodCS, dbo.AnagMag.CodMag, dbo.AnagMag.DescMag, dbo.Blocchi.IdxBlocco, dbo.Blocchi.CodBlocco, dbo.Blocchi.NumX, dbo.Blocchi.NumY, 
                         dbo.Blocchi.NumZ, dbo.ElencoCartellini.Particolare, dbo.AnagStatiProdotto.DescStato, dbo.ElencoCartellini.Esponente
ORDER BY QtaTotPz DESC
go

exec sp_addextendedproperty 'MS_DiagramPane1', '[0E232FF0-B466-11cf-A24F-00AA00A3EFFF, 1.00]
Begin DesignProperties = 
   Begin PaneConfigurations = 
      Begin PaneConfiguration = 0
         NumPanes = 4
         Configuration = "(H (1[40] 4[20] 2[20] 3) )"
      End
      Begin PaneConfiguration = 1
         NumPanes = 3
         Configuration = "(H (1 [50] 4 [25] 3))"
      End
      Begin PaneConfiguration = 2
         NumPanes = 3
         Configuration = "(H (1 [50] 2 [25] 3))"
      End
      Begin PaneConfiguration = 3
         NumPanes = 3
         Configuration = "(H (4 [30] 2 [40] 3))"
      End
      Begin PaneConfiguration = 4
         NumPanes = 2
         Configuration = "(H (1 [56] 3))"
      End
      Begin PaneConfiguration = 5
         NumPanes = 2
         Configuration = "(H (2 [66] 3))"
      End
      Begin PaneConfiguration = 6
         NumPanes = 2
         Configuration = "(H (4 [50] 3))"
      End
      Begin PaneConfiguration = 7
         NumPanes = 1
         Configuration = "(V (3))"
      End
      Begin PaneConfiguration = 8
         NumPanes = 3
         Configuration = "(H (1[56] 4[18] 2) )"
      End
      Begin PaneConfiguration = 9
         NumPanes = 2
         Configuration = "(H (1 [75] 4))"
      End
      Begin PaneConfiguration = 10
         NumPanes = 2
         Configuration = "(H (1[66] 2) )"
      End
      Begin PaneConfiguration = 11
         NumPanes = 2
         Configuration = "(H (4 [60] 2))"
      End
      Begin PaneConfiguration = 12
         NumPanes = 1
         Configuration = "(H (1) )"
      End
      Begin PaneConfiguration = 13
         NumPanes = 1
         Configuration = "(V (4))"
      End
      Begin PaneConfiguration = 14
         NumPanes = 1
         Configuration = "(V (2))"
      End
      ActivePaneConfig = 0
   End
   Begin DiagramPane = 
      Begin Origin = 
         Top = 0
         Left = 0
      End
      Begin Tables = 
         Begin Table = "AnagMag"
            Begin Extent = 
               Top = 22
               Left = 1012
               Bottom = 134
               Right = 1198
            End
            DisplayFlags = 280
            TopColumn = 0
         End
         Begin Table = "Blocchi"
            Begin Extent = 
               Top = 16
               Left = 737
               Bottom = 145
               Right = 923
            End
            DisplayFlags = 280
            TopColumn = 0
         End
         Begin Table = "Celle"
            Begin Extent = 
               Top = 6
               Left = 486
               Bottom = 135
               Right = 672
            End
            DisplayFlags = 280
            TopColumn = 0
         End
         Begin Table = "ElencoCartellini"
            Begin Extent = 
               Top = 163
               Left = 416
               Bottom = 328
               Right = 602
            End
            DisplayFlags = 280
            TopColumn = 0
         End
         Begin Table = "PosizioneUdcCorrente"
            Begin Extent = 
               Top = 116
               Left = 35
               Bottom = 245
               Right = 221
            End
            DisplayFlags = 280
            TopColumn = 0
         End
         Begin Table = "AnagStatiProdotto"
            Begin Extent = 
               Top = 226
               Left = 650
               Bottom = 321
               Right = 836
            End
            DisplayFlags = 280
            TopColumn = 0
         End
      End
   End
   Begin SQLPane = 
   End
   Begin DataPane = 
      Begin ParameterDefaults = ""
      End
      Begin ColumnWidths = 13
         Width = 284
         Width = ', 'SCHEMA', 'dbo', 'VIEW', 'V_DettMagPart'
go

exec sp_addextendedproperty 'MS_DiagramPane2', '1500
         Width = 1500
         Width = 2145
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 2415
         Width = 1500
      End
   End
   Begin CriteriaPane = 
      Begin ColumnWidths = 12
         Column = 1440
         Alias = 900
         Table = 1170
         Output = 720
         Append = 1400
         NewValue = 1170
         SortType = 1350
         SortOrder = 1410
         GroupBy = 1350
         Filter = 1350
         Or = 1350
         Or = 1350
         Or = 1350
      End
   End
End
', 'SCHEMA', 'dbo', 'VIEW', 'V_DettMagPart'
go

exec sp_addextendedproperty 'MS_DiagramPaneCount', 2, 'SCHEMA', 'dbo', 'VIEW', 'V_DettMagPart'
go

create VIEW V_MagazziniOverview
AS
SELECT        dbo.AnagMag.CodCS, dbo.AnagMag.CodMag, dbo.AnagMag.DescMag, dbo.Blocchi.IdxBlocco, dbo.Blocchi.CodBlocco, 
                         dbo.Blocchi.NumX * dbo.Blocchi.NumY * dbo.Blocchi.NumZ AS TotCelle, COUNT(dbo.Celle.IdxCella) AS CelleAttive, COUNT(dbo.PosizioneUdcCorrente.UDC) 
                         AS CelleOccupate, COUNT(dbo.Celle.IdxCella) - COUNT(dbo.PosizioneUdcCorrente.UDC) AS CelleLibere, ISNULL(MIN(dbo.PosizioneUdcCorrente.DataRif), GETDATE()) 
                         AS Oldest, ISNULL(MAX(dbo.PosizioneUdcCorrente.DataRif), GETDATE()) AS Newest
FROM            dbo.Celle RIGHT OUTER JOIN
                         dbo.AnagMag INNER JOIN
                         dbo.Blocchi ON dbo.AnagMag.CodMag = dbo.Blocchi.CodMag AND dbo.AnagMag.CodCS = dbo.Blocchi.CodCS ON 
                         dbo.Celle.IdxBlocco = dbo.Blocchi.IdxBlocco LEFT OUTER JOIN
                         dbo.PosizioneUdcCorrente ON dbo.Celle.IdxCella = dbo.PosizioneUdcCorrente.IdxCella
WHERE        (dbo.Celle.Attiva = 1)
GROUP BY dbo.AnagMag.CodCS, dbo.AnagMag.CodMag, dbo.AnagMag.DescMag, dbo.Blocchi.IdxBlocco, dbo.Blocchi.CodBlocco, dbo.Blocchi.NumX, dbo.Blocchi.NumY, 
                         dbo.Blocchi.NumZ
go

exec sp_addextendedproperty 'MS_DiagramPane1', '[0E232FF0-B466-11cf-A24F-00AA00A3EFFF, 1.00]
Begin DesignProperties = 
   Begin PaneConfigurations = 
      Begin PaneConfiguration = 0
         NumPanes = 4
         Configuration = "(H (1[40] 4[20] 2[20] 3) )"
      End
      Begin PaneConfiguration = 1
         NumPanes = 3
         Configuration = "(H (1 [50] 4 [25] 3))"
      End
      Begin PaneConfiguration = 2
         NumPanes = 3
         Configuration = "(H (1 [50] 2 [25] 3))"
      End
      Begin PaneConfiguration = 3
         NumPanes = 3
         Configuration = "(H (4 [30] 2 [40] 3))"
      End
      Begin PaneConfiguration = 4
         NumPanes = 2
         Configuration = "(H (1 [56] 3))"
      End
      Begin PaneConfiguration = 5
         NumPanes = 2
         Configuration = "(H (2 [66] 3))"
      End
      Begin PaneConfiguration = 6
         NumPanes = 2
         Configuration = "(H (4 [50] 3))"
      End
      Begin PaneConfiguration = 7
         NumPanes = 1
         Configuration = "(V (3))"
      End
      Begin PaneConfiguration = 8
         NumPanes = 3
         Configuration = "(H (1[56] 4[18] 2) )"
      End
      Begin PaneConfiguration = 9
         NumPanes = 2
         Configuration = "(H (1 [75] 4))"
      End
      Begin PaneConfiguration = 10
         NumPanes = 2
         Configuration = "(H (1[66] 2) )"
      End
      Begin PaneConfiguration = 11
         NumPanes = 2
         Configuration = "(H (4 [60] 2))"
      End
      Begin PaneConfiguration = 12
         NumPanes = 1
         Configuration = "(H (1) )"
      End
      Begin PaneConfiguration = 13
         NumPanes = 1
         Configuration = "(V (4))"
      End
      Begin PaneConfiguration = 14
         NumPanes = 1
         Configuration = "(V (2))"
      End
      ActivePaneConfig = 0
   End
   Begin DiagramPane = 
      Begin Origin = 
         Top = 0
         Left = 0
      End
      Begin Tables = 
         Begin Table = "Celle"
            Begin Extent = 
               Top = 149
               Left = 629
               Bottom = 313
               Right = 799
            End
            DisplayFlags = 280
            TopColumn = 4
         End
         Begin Table = "AnagMag"
            Begin Extent = 
               Top = 6
               Left = 662
               Bottom = 118
               Right = 832
            End
            DisplayFlags = 280
            TopColumn = 0
         End
         Begin Table = "Blocchi"
            Begin Extent = 
               Top = 36
               Left = 974
               Bottom = 257
               Right = 1144
            End
            DisplayFlags = 280
            TopColumn = 0
         End
         Begin Table = "PosizioneUdcCorrente"
            Begin Extent = 
               Top = 159
               Left = 201
               Bottom = 288
               Right = 371
            End
            DisplayFlags = 280
            TopColumn = 0
         End
      End
   End
   Begin SQLPane = 
   End
   Begin DataPane = 
      Begin ParameterDefaults = ""
      End
      Begin ColumnWidths = 11
         Width = 284
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1665
         Width = 1665
      End
   End
   Begin CriteriaPane = 
      Begin ColumnWidths = 12
         Column = 1440
         Alias = 900
         Table = 1170
         Output = 720
         Append = 1400
         NewValue = 1170
         SortType = 1350
         SortOrder = 1410
         GroupBy = 1350
         Filter = 1350
         Or', 'SCHEMA', 'dbo', 'VIEW', 'V_MagazziniOverview'
go

exec sp_addextendedproperty 'MS_DiagramPane2', ' = 1350
         Or = 1350
         Or = 1350
      End
   End
End
', 'SCHEMA', 'dbo', 'VIEW', 'V_MagazziniOverview'
go

exec sp_addextendedproperty 'MS_DiagramPaneCount', 2, 'SCHEMA', 'dbo', 'VIEW', 'V_MagazziniOverview'
go

create VIEW V_ParticolariOverview
AS
SELECT        RilPro.AnagParticolari.Particolare, RilPro.AnagParticolari.DescParticolare, ISNULL(COUNT(dbo.ElencoCartellini.UDC), 0) AS NumUDC, 
                         ISNULL(SUM(dbo.ElencoCartellini.Qta), 0) AS TotQta, ISNULL(COUNT(dbo.PosizioneUdcCorrente.IdxCella), 0) AS NumInMag
FROM            RilPro.AnagParticolari LEFT OUTER JOIN
                         dbo.ElencoCartellini ON RilPro.AnagParticolari.Particolare = dbo.ElencoCartellini.Particolare LEFT OUTER JOIN
                         dbo.PosizioneUdcCorrente ON dbo.ElencoCartellini.UDC = dbo.PosizioneUdcCorrente.UDC
GROUP BY RilPro.AnagParticolari.Particolare, RilPro.AnagParticolari.DescParticolare, dbo.ElencoCartellini.UDC, dbo.ElencoCartellini.Qta, dbo.PosizioneUdcCorrente.IdxCella
go

exec sp_addextendedproperty 'MS_DiagramPane1', '[0E232FF0-B466-11cf-A24F-00AA00A3EFFF, 1.00]
Begin DesignProperties = 
   Begin PaneConfigurations = 
      Begin PaneConfiguration = 0
         NumPanes = 4
         Configuration = "(H (1[40] 4[20] 2[20] 3) )"
      End
      Begin PaneConfiguration = 1
         NumPanes = 3
         Configuration = "(H (1 [50] 4 [25] 3))"
      End
      Begin PaneConfiguration = 2
         NumPanes = 3
         Configuration = "(H (1 [50] 2 [25] 3))"
      End
      Begin PaneConfiguration = 3
         NumPanes = 3
         Configuration = "(H (4 [30] 2 [40] 3))"
      End
      Begin PaneConfiguration = 4
         NumPanes = 2
         Configuration = "(H (1 [56] 3))"
      End
      Begin PaneConfiguration = 5
         NumPanes = 2
         Configuration = "(H (2 [66] 3))"
      End
      Begin PaneConfiguration = 6
         NumPanes = 2
         Configuration = "(H (4 [50] 3))"
      End
      Begin PaneConfiguration = 7
         NumPanes = 1
         Configuration = "(V (3))"
      End
      Begin PaneConfiguration = 8
         NumPanes = 3
         Configuration = "(H (1[56] 4[18] 2) )"
      End
      Begin PaneConfiguration = 9
         NumPanes = 2
         Configuration = "(H (1 [75] 4))"
      End
      Begin PaneConfiguration = 10
         NumPanes = 2
         Configuration = "(H (1[66] 2) )"
      End
      Begin PaneConfiguration = 11
         NumPanes = 2
         Configuration = "(H (4 [60] 2))"
      End
      Begin PaneConfiguration = 12
         NumPanes = 1
         Configuration = "(H (1) )"
      End
      Begin PaneConfiguration = 13
         NumPanes = 1
         Configuration = "(V (4))"
      End
      Begin PaneConfiguration = 14
         NumPanes = 1
         Configuration = "(V (2))"
      End
      ActivePaneConfig = 0
   End
   Begin DiagramPane = 
      Begin Origin = 
         Top = 0
         Left = 0
      End
      Begin Tables = 
         Begin Table = "AnagParticolari (RilPro)"
            Begin Extent = 
               Top = 6
               Left = 38
               Bottom = 191
               Right = 208
            End
            DisplayFlags = 280
            TopColumn = 0
         End
         Begin Table = "ElencoCartellini"
            Begin Extent = 
               Top = 6
               Left = 277
               Bottom = 270
               Right = 447
            End
            DisplayFlags = 280
            TopColumn = 0
         End
         Begin Table = "PosizioneUdcCorrente"
            Begin Extent = 
               Top = 7
               Left = 533
               Bottom = 136
               Right = 703
            End
            DisplayFlags = 280
            TopColumn = 0
         End
      End
   End
   Begin SQLPane = 
   End
   Begin DataPane = 
      Begin ParameterDefaults = ""
      End
      Begin ColumnWidths = 9
         Width = 284
         Width = 1500
         Width = 2580
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
         Width = 1500
      End
   End
   Begin CriteriaPane = 
      Begin ColumnWidths = 12
         Column = 1440
         Alias = 900
         Table = 1170
         Output = 720
         Append = 1400
         NewValue = 1170
         SortType = 1350
         SortOrder = 1410
         GroupBy = 1350
         Filter = 1350
         Or = 1350
         Or = 1350
         Or = 1350
      End
   End
End
', 'SCHEMA', 'dbo', 'VIEW', 'V_ParticolariOverview'
go

exec sp_addextendedproperty 'MS_DiagramPaneCount', 1, 'SCHEMA', 'dbo', 'VIEW', 'V_ParticolariOverview'
go

commit
go



-- registro versione...
INSERT INTO [dbo].[LogUpdateDb] ([Versione],[Data]) VALUES(80, GETDATE())
GO